90Ψ C.L. Limits from 〈τ_{WS}〉

R_{Mixing}/(R_{DSCD}+R_{Mixing})

〈τ_{WS}〉/τ_D

(0.65Α0.4)τ_D

0.24

0.12 0.38

1.48τ_D

1.28τ_D cosϕ=+1 cosϕ= 0 cosϕ= -1

0

0.5

1

1.5

2

0 0.1 0.2 0.3 0.4 0.5