cτ_Dcτ_D

All DCSD

cτ_Dcτ_Dcτ_D

-ΔΓ + DCSD τ_{CP-}Λτ_{CP+} mean τ = 0.5 τ_D

y = -0.075 FNAL Limit y Λ 0.075 No limit for -ΔΓ