cτ_D

Expect 70 D^o5K^+π^- Events in 5.5fb^{-1} Stat. Error 12Ψ

All DCSD

+ΔΓϑ FNAL Limit+DCSD τ_{CP+}Λτ_{CP-} mean τ = 2.0 τ_D, y = +0.075