Clearview Town Forum

Harry Nelson November 14, 1994

� u � c s � b � High Energy Physics November 14, 1994

Academic Senate

Committee on Clearview

G. Lucas, Chair

D. Bielby, R. Church, C. Kolstad, H. Nelson, C. Newőeld, C. Pasternack, G. Swindle, Faculty J. Cloud, D. Cole, Students

E. Keller (EIR), T. Theofanous (Plant Safety), Faculty, Technical Advisory Group

Faculty, Students, Residents

Report to the Academic Senate

Provide input for Environmental Impact Report (EIR)

http://charm.physics.ucsb.edu/people/hnn/clearview.html

who com

� u � c s � b � High Energy Physics November 14, 1994

Concerns

Human Safety - Site close to dwellings, schools

Hydrogen Sulőde (H_2S) Gas

present in South Ellwood Oil Lethal Blowout, Well Fire January 28, 1969 Blowout - Platform A-21 Santa Barbara Oil Spill September 24, 1944 Well Fire - Dos Pueblos (1 week) Earthquake, Fire Major Earthquakes - 1812; June 29, 1925;

November 11, 1927; June 30, 1941 Many Fires ‘Operator Error’ Mobil is making credible plans to reduce the risks

concerns

� u � c s � b � High Energy Physics November 14, 1994

Concerns

Environmental Degradation Site close to:

Coal Oil Point Natural Reserve Recreational Area - Sands Beach Dwellings, Childcare, Schools Bad Smells, Noise - not an industrial area Operations day and night for 30 years Mobil has presented credible plans Record:

Mobil’s Torrance Reőnery ARCO’s Ellwood Processing Facility Concern about long-term environmental degradation near Clearview is reasonable. Third-party oversight, for 30 year duration

operate

� u � c s � b � High Energy Physics November 14, 1994

Recruitment, Retention

UCSB on the Upswing A Mistake Now Consequential Planning of Isla Vista not Optimal Recruitment and Retention Faculty - North Campus Housing Entire Community - Staff, Students Degraded Environment Inŕuences Economics

Jobs Clearview - 245 UCSB - 8,000 State Revenue Clearview - $27 million per year Extramural Grants Brought to UCSB by Faculty, Staff: $80 million per year (1993)

recruit

� u � c s � b � High Energy Physics November 14, 1994

We will Carefully Weigh

Safety Environmental Consequences Recruitment and Retention

Prior to Making our Report

conclude